Notice To Gila River Cattlemen
source date: 1891
availability: public-domain

tion will probably begin sometime late in the afternoon, and in order to afford every one in New Mexico an opportunity to see and profit by the experiment they propose to make a rate of one and one third fare for the round trip to El Paso. Notice To Gila River Cattlemen Cattlemen of the Gila river and adjacent ranges are requested to meet at Mule springs, west of White house ranch on L C Cattle com- pany’s range, on September 20, 1891, for the purpose of runding up and identifying any cattle or horses on the Pine Cienega and other ranges close by, that may have been unlawfully branded or otherwise taken and held by any parties not honestly in possession of them. In view of the depredations upon the cattlemen of the Gila river ranges, I would urge upon them the necessity of a general attendance, that they may identify and claim such stock of theirs as may be thus unlawfully held. To each and every honest ranchman on those ranges, it is of the utmost importance that they attend. John Johnson, Foreman L. C. Cattle Co.