Silver City Enterprise — 1891 (full OCR, Internet Archive) — 1891-04-03
source date: 1891
availability: public-domain

A LOST WIFE An excited individual arrived in Phoenix from Silver City, N. M., in search of a fleeing wife and “fiend.” He claims that his better half sold a large herd of cattle on the Mimbres river, and accompanied by his foreman, fled the country, taking the proceeds of the cattle sale with her. The husband says he will forgive his erring better half, but “Jamie” the silent had better seek higher ground. At last accounts neither “Jamie” nor Susan had been heard of. — Phoenix Gazette. SCHUTZ STORE ENGULFED BY FLAMES — BAIN IS HERO

roceeds of the cattle sale with her. The husband says he will forgive his erring better half, but “Jamie” the silent had better seek higher ground. At last accounts neither “Jamie” nor Susan had been heard of. — Phoenix Gazette. SCHUTZ STORE ENGULFED BY FLAMES — BAIN IS HERO On Wednesday evening at fifteen minutes to eight o’clock, while the lights were being extinguished in Aaron Schutz’s store, a large lamp containing a gallon of oil fell, spilling some of the oil which immediately caught fire. At great risk of being severely injured, Clarence Bain caught up the blazing lamp and threw it into the street. But the oil which had spilled had set fire to the whole front of the building on the inside. Several persons tried whipping it out with sacks and drenching it with water from buckets at hand, but to no avail until Mr. H. D. Gilbert threw a couple of hand grenade bottles into the flame, which quickly brought the fire under sufficient control to entirely ex- tinguish it by use of water from buckets. The use of the hand grenades was very timely as a few minutes more and it would have been necessary to turn on the hose which the fire laddies had in readiness. Had the hose been turned on the damage to the stock would have run up into the thousands, while the present loss will be covered by a few hundreds. Mr. Clarence Bain is entitled to great credit for his prompt action in throwing out the blazing lamp, which still contained a large quantity of oil, which would have added fresh fuel and fury to the flame and have caused much greater loss than it did.