Some miscreant set fire to the railroad…
source date: 1891
availability: public-domain

Some miscreant set fire to the railroad bridge of the N. M. and A. railroad, near Clif- ton, recently, and destroyed eight trusses before the fire was discovered. This is the second attempt within a short time to destroy this bridge, and if the cowardly, murderous wretch can be discovered, he should be elevated by the hempen route, and sent where the dogs couldn't bite him.