Teachers employed during current year: C…
source date: 1890
availability: public-domain

Teachers employed during current year: C. A. Goggin, principal, salary, $100.00; Ada M. Cutler, Room 3, salary, $75.00; Mrs. W. L. Jackson, Room 2, salary, $75.00; Miss Lizzie Black, Room 1, salary, $75.00.