The depot was a small platform of planks…
source date: 1891
availability: public-domain

The depot was a small platform of planks set down in the desert. The town was probably three hundred yards from the depot, and as soon as the cars stopped a crowd of probably one hundred of about the worst looking speci- mens of humanity to be found on earth, ran down to the railroad and we were absolutely surrounded.