The examination of other witnesses did not…
source date: 1891
availability: public-domain

The examination of other witnesses did not materially alter the evidence as given above. The testimony was closed about 4 p.m. Judge Alexander made an ingenious talk, paying the highest tribute to the character of Mrs. Hiler, but insisting that the evidence was sufficient to justify the prisoner in believing that the doctor was meddling in his family affairs, and had alienated the affection of his wife. Prosecuting Attorney Ancheta followed in a strong, logical speech which carried conviction with it.