“The first hospital was a four-room cottage,”…
source date: 1889
availability: public-domain

“The first hospital was a four-room cottage,” Mrs. Warren told the Silver City Enterprise in 1932. It was acquired in the year 1 882. and occu- pied the site in the northeastern section of Silver City, where the Black Range Lumber Company planing mill stood before it was destroyed by fire two years ago. The Laizure planing mill was first erected on the spot.