The following officers were installed on…
source date: 1891
availability: public-domain

The following officers were installed on the evening of the 26th inst., at the Silver City Lodge No. 8, A. F. & A. M., Harry W. Lucas, W. M. ; A. H. Harlee, S. W.; M. H. Twomey, J. W. ; P. B. Lady, Secretary; J. W. Carter, Treasurer; H. Abraham, S. D.; J. Card, J. D.; Geo. D. Jones, M. L. White, stewards; J. E. Plows, tyler.