The grand jury was organized as follows:…
source date: 1891
availability: public-domain

The grand jury was organized as follows: C. H. Dane, Foreman ; Ed Pennington, J. A. Ma- honey, T. S. Robinson, John Brockman, D. L. Belt, J. W. Ripley, H. D. Gilbert, H. W. Loomis, W. H. White, Richard Grave, James Matthews, Thomas Lyons, J. Wellgehausen, J. A. Deemer, J. E. Ross, J. M. Wallace, W. H. Newcomb, J. E. Sheridan, Wm. Owens, A. C. Carwile.