The greatest physical achievement ever…
source date: 1891
availability: public-domain

The greatest physical achievement ever accomplished in this country, was the ride of F. X. Aubrey from the plaza of Santa Fe, New Mexico, to the public square at Independence, Missouri, a distance of over 800 miles, through a country inhabited with warlike Indians; a large part of the way was then a sandy desert.