The groom was attired in conventional…
source date: 1891
availability: public-domain

The groom was attired in conventional black. After the ceremony the bridal couple repaired to the parlors of the Timmer, where they passed a couple of pleasant hours receiv- ing their numerous friends. At 9 o’clock the guests were led by the bridal couple to the dining room, where a sumptuous breakfast was served and heartily appreciated.