The jury were out about 20 minutes, when…
source date: 1890
availability: public-domain

The jury were out about 20 minutes, when they returned with a verdict of not guilty. A wild shout went up all over the court room, which the court could not at once suppress. Then followed scores of congratulations from Redding’s friends and general rejoicing; and thus ended a great trial.