The mine is now shut down temporarily,…
source date: 1891
availability: public-domain

The mine is now shut down temporarily, but run steadily for over two years. The mill contains 20-stamps, and the ore averages about $40. The great draw-back to mining in that section is the expense of securing supplies, which are mostly packed in on mules. Wood is also quite expensive as it had to be packed in on burros or mules.