The progress of the flame was stopped by…
source date: 1890
availability: public-domain

The progress of the flame was stopped by the blowing up and tearing down of buildings. “Fritz,” the tailor and janitor of the G.A.R. hall, got badly burned in his efforts to save some of the G.A.R. effects. Some of the firemen were slightly scorched; all did their duty.