The unsuccessful suitor was frantic, and…
source date: 1890
availability: public-domain

The unsuccessful suitor was frantic, and refused to be comforted, much to the amuse- ment of Charley’s friends who had come in to see fair play, and intended to see that Charley got the bride even had it been necessary to rope and hog-tie his rival for the fair hand of Miss Mollie.