Thomas Nolan, the “father of the camp,”…
source date: 1889
availability: public-domain

Thomas Nolan, the “father of the camp,” as he is known in Georgetown, died from an overdose of morphine, taken with suicidal in- tent, on the morning of the 3rd instant.