Towns -- Faywood Hot Springs
author: New Mexico. Department of Tourism
availability: Use of SRCA images may involve obtaining permission from the copyright holder. Please contact SRCA prior to (re)use.

Towns -- Faywood Hot Springs Description: Springhouse at Faywood Hot Springs; Springhouse at Faywood Hot Springs, New Mexico. Elevation 4,520 feet. The spring has a volume of 140,000 gallons daily. The temperature of the water is 142 [degrees] F. The waters have curative properties and are said to be especially helpful in the treatment of stomach and kidney disorders. The climate at the Springs is exceptionally equable. Subject: Buildings - New Mexico - Photographs.;Faywood Hot Springs (N.M.) -- Pictorial works;Grant County (N.M.) -- Pictorial works Creator: New Mexico. Department of Tourism