vicious pony, which becoming scared, started…
source date: 1891
availability: public-domain

vicious pony, which becoming scared, started off on a full run and turned the corner of the Chinese wash house at the corner of Main and Yankee streets rather abruptly. It was feared the little lady \vould be brushed off and hurt by coming in contact with the building, but fortunately the accident was avoided. Miss Lillie now takes her exercise on foot.