who went to the relief of the team, had to join…
source date: 1888
availability: public-domain

who went to the relief of the team, had to join the boy. The pair being afraid of the break- water giving away climbed a tree and remained until danger was over. While trying to get near to the boy his father crossed Main street, near the bank, and was knocked down three times by the current.